<!-- Code generated from the comments of the WinRM struct in packer-plugin-sdk/communicator/config.go; DO NOT EDIT MANUALLY -->

- `winrm_username` (string) - The username to use to connect to WinRM.

- `winrm_password` (string) - The password to use to connect to WinRM.

- `winrm_host` (string) - The address for WinRM to connect to.

  NOTE: If using an Amazon EBS builder, you can specify the interface
  WinRM connects to via
  [`ssh_interface`](/docs/builders/amazon-ebs#ssh_interface)

- `winrm_no_proxy` (bool) - Setting this to `true` adds the remote
  `host:port` to the `NO_PROXY` environment variable. This has the effect of
  bypassing any configured proxies when connecting to the remote host.
  Default to `false`.

- `winrm_port` (int) - The WinRM port to connect to. This defaults to `5985` for plain
  unencrypted connection and `5986` for SSL when `winrm_use_ssl` is set to
  true.

- `winrm_timeout` (duration string | ex: "1h5m2s") - The amount of time to wait for WinRM to become available. This defaults
  to `30m` since setting up a Windows machine generally takes a long time.

- `winrm_use_ssl` (bool) - If `true`, use HTTPS for WinRM.

- `winrm_insecure` (bool) - If `true`, do not check server certificate chain and host name.

- `winrm_use_ntlm` (bool) - If `true`, NTLMv2 authentication (with session security) will be used
  for WinRM, rather than default (basic authentication), removing the
  requirement for basic authentication to be enabled within the target
  guest. Further reading for remote connection authentication can be found
  [here](<https://msdn.microsoft.com/en-us/library/aa384295(v=vs.85).aspx>).
