<!-- Code generated from the comments of the RemoveCDRomConfig struct in builder/vsphere/common/step_remove_cdrom.go; DO NOT EDIT MANUALLY -->

- `remove_cdrom` (bool) - Remove CD-ROM devices from template. Defaults to `false`.
