<!-- Code generated from the comments of the HardwareConfig struct in builder/vsphere/common/step_hardware.go; DO NOT EDIT MANUALLY -->

- `CPUs` (int32) - Number of CPU cores.

- `cpu_cores` (int32) - Number of CPU cores per socket.

- `CPU_reservation` (int64) - Amount of reserved CPU resources in MHz.

- `CPU_limit` (int64) - Upper limit of available CPU resources in MHz.

- `CPU_hot_plug` (bool) - Enable CPU hot plug setting for virtual machine. Defaults to `false`.

- `RAM` (int64) - Amount of RAM in MB.

- `RAM_reservation` (int64) - Amount of reserved RAM in MB.

- `RAM_reserve_all` (bool) - Reserve all available RAM. Defaults to `false`. Cannot be used together
  with `RAM_reservation`.

- `RAM_hot_plug` (bool) - Enable RAM hot plug setting for virtual machine. Defaults to `false`.

- `video_ram` (int64) - Amount of video memory in KB.

- `vgpu_profile` (string) - vGPU profile for accelerated graphics. See [NVIDIA GRID vGPU documentation](https://docs.nvidia.com/grid/latest/grid-vgpu-user-guide/index.html#configure-vmware-vsphere-vm-with-vgpu)
  for examples of profile names. Defaults to none.

- `NestedHV` (bool) - Enable nested hardware virtualization for VM. Defaults to `false`.

- `firmware` (string) - Set the Firmware for virtual machine. Supported values: `bios`, `efi` or `efi-secure`. Defaults to `bios`.

- `force_bios_setup` (bool) - During the boot, force entry into the BIOS setup screen. Defaults to `false`.
