<!-- Code generated from the comments of the BootConfig struct in builder/vsphere/common/step_boot_command.go; DO NOT EDIT MANUALLY -->

- `http_ip` (string) - The IP address to use for the HTTP server started to serve the `http_directory`.
  If unset, Packer will automatically discover and assign an IP.
