<!-- Code generated from the comments of the HWConfig struct in builder/parallels/common/hw_config.go; DO NOT EDIT MANUALLY -->

- `cpus` (int) - The number of cpus to use for building the VM.
  Defaults to 1.

- `memory` (int) - The amount of memory to use for building the VM in
  megabytes. Defaults to 512 megabytes.

- `sound` (bool) - Specifies whether to enable the sound device when
  building the VM. Defaults to false.

- `usb` (bool) - Specifies whether to enable the USB bus when building
  the VM. Defaults to false.
