<!-- Code generated from the comments of the Config struct in builder/ncloud/config.go; DO NOT EDIT MANUALLY -->

- `access_key` (string) - Access Key

- `secret_key` (string) - Secret Key

- `member_server_image_no` (string) - Previous image code. If there is an
  image previously created, it can be used to create a new image.
  (server_image_product_code is required if not specified)

- `server_image_name` (string) - Name of an image to create.

- `server_image_description` (string) - Description of an image to create.

- `user_data` (string) - User data to apply when launching the instance. Note
  that you need to be careful about escaping characters due to the templates
  being JSON. It is often more convenient to use user_data_file, instead.
  Packer will not automatically wait for a user script to finish before
  shutting down the instance this must be handled in a provisioner.

- `user_data_file` (string) - Path to a file that will be used for the user
  data when launching the instance.

- `block_storage_size` (int) - You can add block storage ranging from 10
  GB to 2000 GB, in increments of 10 GB.

- `region` (string) - Name of the region where you want to create an image.
  (default: Korea)

- `access_control_group_configuration_no` (string) - This is used to allow
  winrm access when you create a Windows server. An ACG that specifies an
  access source (0.0.0.0/0) and allowed port (5985) must be created in
  advance.
