<!-- Code generated from the comments of the Config struct in builder/lxd/config.go; DO NOT EDIT MANUALLY -->

- `image` (string) - The source image to use when creating the build
  container. This can be a (local or remote) image (name or fingerprint).
  E.G. my-base-image, ubuntu-daily:x, 08fababf6f27, ...
