<!-- Code generated from the comments of the Config struct in datasource/null/data.go; DO NOT EDIT MANUALLY -->

- `input` (string) - This variable will get stored as "output" in the output spec.

<!-- End of code generated from the comments of the Config struct in datasource/null/data.go; -->
