<!-- Code generated from the comments of the Config struct in post-processor/ucloud-import/post-processor.go; DO NOT EDIT MANUALLY -->

- `ufile_key_name` (string) - The name of the object key in
   `ufile_bucket_name` where the RAW, VHD, VMDK, or qcow2 file will be copied
   to import. This is a [template engine](/docs/templates/engine).
   Therefore, you may use user variables and template functions in this field.

- `skip_clean` (bool) - Whether we should skip removing the RAW, VHD, VMDK, or qcow2 file uploaded to
  UFile after the import process has completed. Possible values are: `true` to
  leave it in the UFile bucket, `false` to remove it. (Default: `false`).

- `image_description` (string) - The description of the image.

- `wait_image_ready_timeout` (int) - Timeout of importing image. The default timeout is 3600 seconds if this option is not set or is set.
