<!-- Code generated from the comments of the Config struct in builder/vmware/vmx/config.go; DO NOT EDIT MANUALLY -->

- `source_path` (string) - Path to the source VMX file to clone. If
  remote_type is enabled then this specifies a path on the remote_host.
