---
layout: docs
page_title: Common sink parameters
description: |-
  The common sink parameters for all sink types.
---

⚠️⚠️⚠️⚠️⚠️⚠️⚠️⚠️⚠️⚠️⚠️⚠️
> [!IMPORTANT]  
> **Documentation Update:** Product documentation previously located in `/website` has moved to the [`hashicorp/web-unified-docs`](https://github.com/hashicorp/web-unified-docs) repository, where all product documentation is now centralized. Please make contributions directly to `web-unified-docs`, since changes to `/website` in this repository will not appear on developer.hashicorp.com.
⚠️⚠️⚠️⚠️⚠️⚠️⚠️⚠️⚠️⚠️⚠️⚠️

# Common sink parameters

@include '/configuration-reference/events/common-sink-intro.mdx'

## `audit_config` parameters

@include '/configuration-reference/events/common-audit_config-parameters.mdx'

### `audit_filter_overrides` parameters

@include '/configuration-reference/events/common-audit_filter_overrides-parameters.mdx'

## `audit_config` examples

@include '/configuration-reference/events/common-audit_config-examples.mdx'
